Supervised and Monitoring the AS/400 Data Center Operators' activity, Tasks and Email reports compliance at Night Shift.
On Call and On Standby Support at 24/7 schedule.
Supervises and Maintains an up-to-date technical knowledge and standard understanding of practical computer operations and systems; for the Data Center Operators' Daily/Weekly Tasks and Job alignment.
To plot for an additional and improvement tasks to the AS/400 DC Operator.
Monitor the Weekly Data Integrity assessment, process validations and recommendations for the Four JDA Production Systems' Daily Backups.
TAP04 Tape drive was still being used as a workaround while IBM Support is investigating the error msg 'Interface Error while using device TAP01' occurred.