Midland Emergency Power Interruption Activity (Phase 2). This includes execution of Phase 2 tasks of the said activity. Monitoring and Support on powering up all VM servers, Network devices, UPS and circuit breakers. Collaboration and coordination with all end users that will be affected. Validation and testing of all IT systems affected by the activity. System Administration. This includes daily support to all system administration related service request and incidents. Strict monitoring routine of all servers and ensuring all are working properly for smooth and continuous flow of daily production on all work areas. Provide proactive actions to minimize issues occurring on different machines. Provide immediate response and on the spot solutions to all service requests and incidents. Provide service standard on all end users and ensuring their service requests are resolved with highest satisfaction rating., Monitoring and maintenance of Outlook/Exchange Server. This includes checking of all databases and making sure it is all mounted. Checking of all mail services and making sure it is all activated and running., Monitoring of Backup and Data Housekeeping of Veeam Backup & Replication Server. This includes checking of all backup task/activities are running. Ensuring all daily and weekly full backup has been successfully done. Also Data Housekeeping of all previous backup and executing proactive actions to prevent storage of backup server not to exceed its limit., Monitoring and maintenance of Lexer SFTP Server. This includes daily checking of the server and ensuring all files needed are uploaded successfully. Provide proactive actions on failed uploads on the server.