- Comestri OMS PM work, comms, and follow-ups
- Review and update Project Working File
- Review and updating of OMS defects/queries from initial SIT and functional testing
- Review and updating of OP Technical Deliverables List
- Work on summary of Phase 2 stores hardware requirements for EBG budget purpose
- Work on SIT defect tickets creation and updating